/*
  Warnings:

  - You are about to drop the column `ausstellungsdatum` on the `Aufnahme` table. All the data in the column will be lost.
  - You are about to drop the column `ausweisart` on the `Aufnahme` table. All the data in the column will be lost.
  - You are about to drop the column `boxpruefung` on the `Aufnahme` table. All the data in the column will be lost.
  - You are about to drop the column `brennstoff_1` on the `Aufnahme` table. All the data in the column will be lost.
  - You are about to drop the column `brennstoff_2` on the `Aufnahme` table. All the data in the column will be lost.
  - You are about to drop the column `energieeffizienzklasse` on the `Aufnahme` table. All the data in the column will be lost.
  - You are about to drop the column `uid` on the `Bild` table. All the data in the column will be lost.
  - You are about to drop the column `keller_beheizt` on the `VerbrauchsausweisWohnen` table. All the data in the column will be lost.

*/
-- DropIndex
DROP INDEX "Bild_uid_key";

-- AlterTable
ALTER TABLE "Aufnahme" DROP COLUMN "ausstellungsdatum",
DROP COLUMN "ausweisart",
DROP COLUMN "boxpruefung",
DROP COLUMN "brennstoff_1",
DROP COLUMN "brennstoff_2",
DROP COLUMN "energieeffizienzklasse";

-- AlterTable
ALTER TABLE "BedarfsausweisWohnen" ADD COLUMN     "ausstellungsdatum" TIMESTAMP(3),
ADD COLUMN     "boxpruefung" BOOLEAN DEFAULT false,
ADD COLUMN     "energieeffizienzklasse" VARCHAR(5);

-- AlterTable
ALTER TABLE "Bild" DROP COLUMN "uid";

-- AlterTable
ALTER TABLE "VerbrauchsausweisGewerbe" ADD COLUMN     "ausstellungsdatum" TIMESTAMP(3),
ADD COLUMN     "boxpruefung" BOOLEAN DEFAULT false,
ADD COLUMN     "energieeffizienzklasse" VARCHAR(5);

-- AlterTable
ALTER TABLE "VerbrauchsausweisWohnen" DROP COLUMN "keller_beheizt",
ADD COLUMN     "ausstellungsdatum" TIMESTAMP(3),
ADD COLUMN     "boxpruefung" BOOLEAN DEFAULT false,
ADD COLUMN     "brennstoff_1" VARCHAR(50),
ADD COLUMN     "brennstoff_2" VARCHAR(50),
ADD COLUMN     "energieeffizienzklasse" VARCHAR(5);
