/*
  Warnings:

  - You are about to drop the column `rohrnetztyp_18599` on the `BedarfsausweisWohnen` table. All the data in the column will be lost.
  - You are about to drop the column `waerme_erzeugung_heizung_18599` on the `BedarfsausweisWohnen` table. All the data in the column will be lost.
  - You are about to drop the column `waerme_erzeugung_heizung_art_18599` on the `BedarfsausweisWohnen` table. All the data in the column will be lost.

*/
-- AlterTable
ALTER TABLE "BedarfsausweisWohnen" DROP COLUMN "rohrnetztyp_18599",
DROP COLUMN "waerme_erzeugung_heizung_18599",
DROP COLUMN "waerme_erzeugung_heizung_art_18599",
ALTER COLUMN "planungswerte_bauteil" SET DEFAULT '[{}]';
